DROP TABLE IF EXISTS `test`.`test_object`;
CREATE TABLE `test`.`test_object` (
  `ID` int(10) unsigned NOT NULL auto_increment,
  `NUMBER` int(10) unsigned NOT NULL default '0',
  `TEXT` varchar(30) NOT NULL default 'text',
  `FIXED_SIZE_DATA` tinyblob default NULL,
 PRIMARY KEY  (`ID`)
) ENGINE=InnoDB DEFAULT CHARSET=latin1 COMMENT='Test Object Table';